-- phpMyAdmin SQL Dump
-- version 4.6.6
-- https://www.phpmyadmin.net/
--
-- 主機: 127.0.0.1
-- 產生時間： 2022-01-05 09:24:12
-- 伺服器版本: 5.7.17-log
-- PHP 版本： 5.6.30

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- 資料庫： `erp`
--

-- --------------------------------------------------------

--
-- 資料表結構 `規格表`
--

CREATE TABLE `規格表` (
  `內部料號` varchar(11) NOT NULL DEFAULT '00000000000',
  `名稱` varchar(30) DEFAULT NULL,
  `原廠料號` varchar(30) DEFAULT NULL,
  `尺寸` varchar(30) DEFAULT NULL,
  `封裝/材質` varchar(30) DEFAULT NULL,
  `工作電壓` varchar(10) DEFAULT NULL,
  `工作電流` varchar(10) DEFAULT NULL,
  `功率` varchar(10) DEFAULT NULL,
  `最大電流` varchar(10) DEFAULT NULL,
  `工作溫度` varchar(10) DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

--
-- 資料表的匯出資料 `規格表`
--

INSERT INTO `規格表` (`內部料號`, `名稱`, `原廠料號`, `尺寸`, `封裝/材質`, `工作電壓`, `工作電流`, `功率`, `最大電流`, `工作溫度`) VALUES
('01010001T01', '123', '123', '123', '123', '123', '123', '123', '123', '123'),
('01010002T01', '123', '123', '123', '123', '123', '123', '123', '123', '123'),
('04030001T01', '電阻-18Ω', 'RC0603FR-1318RL', '0603', 'SMD', 'NULL', 'NULL', 'NULL', 'NULL', '(-55)~125'),
('04030002T01', '電阻-51Ω', 'SR0603JR-0751RL', '0603', 'SMD', NULL, NULL, NULL, NULL, '(-55)~155'),
('04030003T01', '電阻-150Ω', 'RC0603JR-13150RL', '0603', 'SMD', NULL, NULL, NULL, NULL, '(-55)~155'),
('04030004T01', '電阻-330Ω', '庫存?', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030005T01', '電阻-510Ω', 'RT0603BRE07510RL', '0603', 'SMD', NULL, NULL, NULL, NULL, '(-55)~155'),
('04030006T01', '電阻-1KΩ', 'RT0603FRE071KL', '0603', 'SMD', NULL, NULL, NULL, NULL, '(-55)~155'),
('04030007T01', '電阻-2KΩ', 'RT0603FRE072KL', '0603', 'SMD', NULL, NULL, NULL, NULL, '(-55)~155'),
('04030008T01', '電阻-4.7KΩ', 'RT0603BRD134K7L', '0603', 'SMD', NULL, NULL, NULL, NULL, '(-55)~155'),
('04030009T01', '電阻-10KΩ', '庫存?', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030010T01', '電阻-10MΩ', 'RP0610M0FR', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030011T01', '電阻-100KΩ', 'AC0603FR-13100KL', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030012T01', '電阻-210KΩ', 'RC0603FR-07210KL', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030013T01', '電阻-24.9KΩ', 'RC0603FR-1024K9L', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030014T01', '電阻-40.2KΩ', 'RC0603FR-0740K2L', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030015T01', '電容-6pF', 'CL10C060CB8NNNC', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030016T01', '電容-20pF', NULL, '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030017T01', '電容-103pF', '庫存?', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030018T01', '電容-2.2uF', 'C1608X7R1A225M080AC', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030019T01', '電容-10uF', 'GRM188R6YA106MA73J', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030020T01', '電容-0.1uF', '庫存?', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030021T01', '電容-22uF', 'CC0603MRX6S5BB226', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030022T01', '電容-150pF', 'AC0603JRNPO0BN151', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030023T01', 'MCU-STM32F407VET6', 'STM32F407VET6', '14*14(mm)', 'LQFP100', '1.8V~3.6V', '9mA', '465mW', '20mA', '(-40)~85'),
('04030024T01', 'XTAL-32.768K', 'NX3215SA-32.768K-STD-MUA-14', '3.2*1.5(mm)', 'SMD', NULL, NULL, '0.1uW', NULL, '(-40)~85'),
('04030025T01', 'microSD', '104031-0811', '14*14.2(mm)', 'SMD', NULL, '0.5A', NULL, NULL, '(-25)~85'),
('04030026T01', 'LED', 'KG DELMS1.22-PHQI-24-E6L6', '0603', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030027T01', 'button', 'EVQ-PNF05M', '6*3.5(mm)', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030028T01', '排針-1*2pin', NULL, '2.54(mm)', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030029T01', '排針-1*3pin', NULL, '2.54(mm)', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030030T01', '排針-1*4pin', NULL, '2.54(mm)', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030031T01', '排針-1*6pin', NULL, '2.54(mm)', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030032T01', '保險絲夾-9376B', '9376B', '5*20(mm)', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030034T01', '穩壓IC-1117', 'NCP1117DT33RKG', '6.5*3.5(mm)', 'SMD', NULL, NULL, NULL, NULL, NULL),
('04030035T01', '穩壓IC-MP1584', 'MP1584EN-LF-Z', '5*6.2(mm)', 'SOIC-8', '5V', NULL, '15W', '3A', '(-20)~85'),
('04030036T01', '電感-15uH', 'CDRH104RNP-150NC', '10.5*10.3*4(mm)', 'SMD', NULL, '3.1A', NULL, '3.5A', '(-40)~100'),
('04030037T01', '二極體-B340A_13_F', 'B340A-13-F', '2.92*4.6*2.3(mm)', 'SMA (DO-214AC)', '500mV', '3A', '1.5W', NULL, '(-55)~125'),
('04030038T01', '莫式座- 2.54_180_1*2pin', 'XH2.54-2P 180度', '2.54mm/180度', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030039T01', '莫式座- 1.25_180_1*3pin', '庫存?', '1.25mm/180度', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030040T01', '莫式座- 1.25_180_1*4pin', '庫存?', '1.25mm/180度', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030041T01', '網路IC-DP83848', 'DP83848c', '7*7(mm)', 'LQFP-48', NULL, NULL, NULL, NULL, NULL),
('04030042T01', '無線模組-zigbee', '庫存?', '30.3*16.2(mm)', NULL, NULL, NULL, NULL, NULL, NULL),
('04030043T01', '電容-10nF', 'C0603C103J5RAC', '0603', 'SMD', NULL, NULL, NULL, NULL, '(-55)~125'),
('04030044T01', 'XTAL-50MHz', 'ECS-TXO-2520-33-500-AN-TR', '2.5*2(mm)', 'SMD', '3.3 V', '10uA', '0.33mW', NULL, '(-40)~85'),
('04030045T01', '二極體-SS14', 'SS14', '2.83*5.33*2.5(mm)', 'SMD', '500mV', '1A', '0.5W', NULL, '(-55)~125'),
('04030046T01', '光耦合IC-PC817X4NSZ2B', 'PC817X4NSZ2B', '10*4.58*3.5(mm)', 'DIP-4', '5V', '50mA', '200mW', NULL, '(-30)~100'),
('04030047T01', '電晶體-FMMT634QTA', 'FMMT634QTA', '2.9*2.4*1.025(mm)', 'SMD(SOT-23-3)', '0.85V', '900mA', '806mW', NULL, '(-55)~150'),
('04030048T01', '繼電器-APAN3105', 'APAN3105', '21x5x12.8(mm)', 'Through Hole', NULL, NULL, NULL, NULL, NULL),
('04030049T01', '通訊模組-MAX485', 'MAX485', '44*14(mm)', 'Through Hole', NULL, NULL, NULL, NULL, NULL),
('04030050T01', '無線模組-ESP12S', 'ESP12S', '16*24*3(mm)', 'SMD', '3.3V', '300mA', '990mW', NULL, '(-20)~85'),
('04030051T01', 'RJ45', 'RJMG1BD3B8K1ANR', '15.75*21.72*15.73(mm)', 'Through Hole', NULL, NULL, NULL, NULL, '0~70'),
('04030052T01', '莫式座- 2.54_90_1*2pin', 'S2B-XH-A(LF)(SN)', '2.54mm/90度', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030053T01', 'XTAL-8MHz', '9B-26.000MEEJ-B', '11.5*5*3.68(mm)', 'HC-49', NULL, NULL, '500uW', NULL, '(-20)~70'),
('04030054T01', '莫式座- 1.25_180_1*5pin', '庫存?', '1.25mm/180度', 'DIP', NULL, NULL, NULL, NULL, NULL),
('04030056T01', '電阻-3KΩ', 'RC0603FR-073KS', '0603', 'SMD', NULL, NULL, NULL, NULL, '(-55)~125'),
('04030057T01', '莫式座- 2.54_180_1*6pin', '530470610', '2.54mm/180度', 'DIP', NULL, NULL, NULL, NULL, NULL);

--
-- 已匯出資料表的索引
--

--
-- 資料表索引 `規格表`
--
ALTER TABLE `規格表`
  ADD PRIMARY KEY (`內部料號`);

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
