-- phpMyAdmin SQL Dump
-- version 4.6.6
-- https://www.phpmyadmin.net/
--
-- 主機: 127.0.0.1
-- 產生時間： 2021-12-02 08:54:00
-- 伺服器版本: 5.7.17-log
-- PHP 版本： 5.6.30

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- 資料庫： `erp`
--

-- --------------------------------------------------------

--
-- 資料表結構 `product_info`
--

CREATE TABLE `product_info` (
  `NO` varchar(6) NOT NULL,
  `內部料號` varchar(10) DEFAULT NULL,
  `品名` varchar(177) DEFAULT NULL,
  `規格型號` varchar(41) DEFAULT NULL,
  `類型` varchar(5) DEFAULT NULL,
  `技術文件連結` varchar(10) DEFAULT NULL,
  `原廠料號` varchar(10) DEFAULT NULL,
  `賣家料號` varchar(10) DEFAULT NULL,
  `圖示` varchar(10) DEFAULT NULL,
  `進單價` varchar(10) DEFAULT NULL,
  `數量` varchar(10) DEFAULT NULL,
  `單位` varchar(10) DEFAULT NULL,
  `取得方式` varchar(30) NOT NULL,
  `庫存` varchar(30) NOT NULL,
  `廠商` varchar(10) DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

--
-- 資料表的匯出資料 `product_info`
--

INSERT INTO `product_info` (`NO`, `內部料號`, `品名`, `規格型號`, `類型`, `技術文件連結`, `原廠料號`, `賣家料號`, `圖示`, `進單價`, `數量`, `單位`, `取得方式`, `庫存`, `廠商`) VALUES
('001', '001', '001', '001', '001', '001', '001', '001', '001', '001', '001', '001', '001', '001', '001'),
('1', 'E3S21', '1/4\"  螺絲', '六角', ' 螺絲', ' ', '', '', '', '', '', '個', '', '', '鴻霖'),
('10', 'E3S5-2', 'M4x6( 皿型) 螺絲', '六角', ' 螺絲', '123', '', '', '', '', '', '個', '', '', '鴻霖'),
('11', 'E3S07', 'M4x8 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '套', '', '', '鴻霖'),
('12', 'E3S5-1', 'M5x10 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('13', 'E3S08', 'M5x25 ( 含墊圈) 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('14', 'E3S03', 'M6 x20 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('15', 'E3S20', 'M6 x45 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('16', 'E3S23', 'M6  薄螺帽', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('17', 'E3S11-2', 'M6x10 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('18', 'E3S11-1', 'M6x16 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('19', 'E3S06', 'M6x30 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('2', 'E3S13', 'M10x16 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('20', 'E3S09', 'M6x40 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('21', 'E3S19-1', 'M6x5 ( 聯軸器用) 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('21-1', 'A-1-1-1.1', '風速感測器', 'YGC-FS', ' 感測器', '', '', '', '', '', '', '', '', '', ''),
('21-10', 'A-1-2-1.4', '照度感測器模組', 'GY-30', ' 感測器', '', '', '', '', '', '', '', '', '', ''),
('21-100', 'A-1-4-11.1', '三合一土壤感測器', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-101', 'A-1-4-11.2', '三合一土壤感測器 MK-SSL 4.5', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-102', 'A-1-4-11.3', '4.5 G 鋁殼', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-103', 'A-1-4-2.1', 'mini PCI-E', '48099-5701', '', '', '', '', '', '', '', '', '', '', ''),
('21-104', 'A-1-4-2.2', '歐式端子台 公座 3.81mm 5Pin', 'KF2EDGR-Y-3.81-5P(包)', '', '', '', '', '', '', '', '', '', '', ''),
('21-105', 'A-1-4-2.3', '歐式端子台 母座 3.81mm 5Pin', 'KF2EDGR-Y-3.81-5P-16(包)', '', '', '', '', '', '', '', '', '', '', ''),
('21-106', 'A-1-4-2.4', '歐式端子台 公座 5.08mm 10Pin', 'KF2EDGR-X-5.08-10P-16(包)', '', '', '', '', '', '', '', '', '', '', ''),
('21-107', 'A-1-4-2.5', '歐式端子台 公座 5.08mm 5Pin', 'KF2EDGR-X-5.08-5P-1G(包)', '', '', '', '', '', '', '', '', '', '', ''),
('21-108', 'A-1-4-2.6', '排針 2.54mm 2x8 Pin', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-109', 'A-1-4-4.1', '太陽能控制器 5A/10A', 'CTK5S', '', '', '', '', '', '', '', '', '', '', ''),
('21-11', 'A-1-2-1.5', '時鐘模組', 'YL-41', '', '', '', '', '', '', '', '', '', '', ''),
('21-110', 'A-1-4-4.2', '太陽能控制器 12V/24V 20A', 'DHS-WP', '', '', '', '', '', '', '', '', '', '', ''),
('21-111', 'A-1-4-4.3', '太陽能控制器 12.8V 10A', 'CTKWP', '', '', '', '', '', '', '', '', '', '', ''),
('21-112', 'A-3-4-1.1', '保險絲', 'BGDP 1A 5x20mm', '', '', '', '', '', '', '', '', '', '', ''),
('21-113', 'A-3-4-1.2', '保險絲', 'MINIATURE F50MA250V 0.5A 5x20mm', '', '', '', '', '', '', '', '', '', '', ''),
('21-114', 'A-3-4-1.3', '保險絲', 'GIN SING F3AL250V 3A 5x30mm', '', '', '', '', '', '', '', '', '', '', ''),
('21-115', 'A-3-4-17.1', '水流開關', 'HFS-20A 6分', '', '', '', '', '', '', '', '', '', '', ''),
('21-116', 'A-3-4-2.1', 'N相接地銅排', 'N-12P', '', '', '', '', '', '', '', '', '', '', ''),
('21-117', 'A-3-4-2.2', '軌道式端子盤        ', '天得 TBR-60 60A', '', '', '', '', '', '', '', '', '', '', ''),
('21-118', 'A-3-4-2.3', '軌道式端子盤	', '天得 TBR-100 100A', '', '', '', '', '', '', '', '', '', '', ''),
('21-119', 'A-3-4-2.4', '側蓋	', '天得 TBR-60H ', '', '', '', '', '', '', '', '', '', '', ''),
('21-12', 'A-1-2-1.6', '時鐘模組', 'DS3231', '', '', '', '', '', '', '', '', '', '', ''),
('21-120', 'A-3-4-2.5', '側蓋	 ', '天得 TBR-100H', '', '', '', '', '', '', '', '', '', '', ''),
('21-121', 'A-3-4-2.6', '固定片	', '天得 TBR-F', '', '', '', '', '', '', '', '', '', '', ''),
('21-122', 'A-3-4-4.1', '汽車點煙頭', '京港科技 341301000000', '', '', '', '', '', '', '', '', '', '', ''),
('21-123', 'A-3-4-4.2', '汽車點煙座 附按鈕開關', '京港科技 341301000001', '', '', '', '', '', '', '', '', '', '', ''),
('21-124', 'A-3-4-4.3', '汽車點煙座 附線', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-125', 'A-3-4-4.4', '汽車點煙座轉DC 5.5mm', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-126', 'A-3-4-5.1', '圓線彈簧 WR27-35', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-127', 'A-3-4-6.1', '圓孔母座 2.54mm 18Pin', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-128', 'A-4-1-1.1', '土壤水分計', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-129', 'A-4-1-1.10', '土壤四合一', 'HYDRA-PROBE II', '', '', '', '', '', '', '', '', '', '', ''),
('21-13', 'A-1-2-1.7', 'VOC 氣體感測模組', 'WSP2110', '', '', '', '', '', '', '', '', '', '', ''),
('21-130', 'A-4-1-1.11', 'CO2溫濕度計', 'JVT-250', '', '', '', '', '', '', '', '', '', '', ''),
('21-131', 'A-4-1-1.12', '電磁閥', 'EVRM-NA 2 3/4\"', '', '', '', '', '', '', '', '', '', '', ''),
('21-132', 'A-4-1-1.13', '電磁閥', 'SMC VX2120-01-5G1 DC24V 1/8\"', '', '', '', '', '', '', '', '', '', '', ''),
('21-133', 'A-4-1-1.14', '電磁閥', 'Wu Ming V2A1022506 DC12V 1/4\"', '', '', '', '', '', '', '', '', '', '', ''),
('21-134', 'A-4-1-1.15', '電磁閥', '泰鑫 2W200-20 DC12V 3/4\"', '', '', '', '', '', '', '', '', '', '', ''),
('21-135', 'A-4-1-1.16', '逆止閥', '白色 3/4\"', '', '', '', '', '', '', '', '', '', '', ''),
('21-136', 'A-4-1-1.17', '黃銅六角接頭', '內牙 1/2\"', '', '', '', '', '', '', '', '', '', '', ''),
('21-137', 'A-4-1-1.18', '防火牆', 'ZyWALL 2 Plus ', '', '', '', '', '', '', '', '', '', '', ''),
('21-138', 'A-4-1-1.2', '車載連接器(線材+接頭)', '206T08-1', '', '', '', '', '', '', '', '', '', '', ''),
('21-139', 'A-4-1-1.3', '逆變器', 'IO-POWER IOP-DAPI-12242A-1', '', '', '', '', '', '', '', '', '', '', ''),
('21-14', 'A-1-2-10.1', 'SMA外螺內孔轉IPEX轉接線', '10cm', '', '', '', '', '', '', '', '', '', '', ''),
('21-140', 'A-4-1-1.4', 'PH感測器', 'sen0161', '', '', '', '', '', '', '', '', '', '', ''),
('21-141', 'A-4-1-1.5', '光量子感測器管夾', '36681', '', '', '', '', '', '', '', '', '', '', ''),
('21-142', 'A-4-1-1.6', 'LED Controller', 'DC12V-24V', '', '', '', '', '', '', '', '', '', '', ''),
('21-143', 'A-4-1-1.7', 'ph感測器接線', 'E-1312-EC1-M10ST', '', '', '', '', '', '', '', '', '', '', ''),
('21-144', 'A-4-1-1.8', 'STM32F407VET6上板', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-145', 'A-4-1-1.9', 'STM32F407VET6下板', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-146', 'A-5-1-1.1', '電源供應器 12V 1.0A', 'LRS-50-12', '', '', '', '', '', '', '', '', '', '', ''),
('21-147', 'A-5-1-1.10', '電源供應器 12V 0.74A', 'LRS-35-12', '', '', '', '', '', '', '', '', '', '', ''),
('21-148', 'A-5-1-1.2', '電源供應器 12V 2.1A', 'LRS-100-12', '', '', '', '', '', '', '', '', '', '', ''),
('21-149', 'A-5-1-1.3', '電源供應器 15V 1.0A', 'LRS-50-15', '', '', '', '', '', '', '', '', '', '', ''),
('21-15', 'A-1-2-10.2', 'SMA外螺內孔轉IPEX轉接線', '20cm', '', '', '', '', '', '', '', '', '', '', ''),
('21-150', 'A-5-1-1.4', '電源供應器 24V 0.35A', 'RS-15-24', '', '', '', '', '', '', '', '', '', '', ''),
('21-151', 'A-5-1-1.5', '電源供應器 24V 2.0A', 'RS-75-24', '', '', '', '', '', '', '', '', '', '', ''),
('21-152', 'A-5-1-1.6', '電源供應器 48V 2.5A', 'NES-100-48', '', '', '', '', '', '', '', '', '', '', ''),
('21-153', 'A-5-1-1.7', '電源供應器 12V 6A', 'LRS-75-12', '', '', '', '', '', '', '', '', '', '', ''),
('21-154', 'A-5-1-1.8', '電源供應器 24V 14.6A', 'LRS-75-24', '', '', '', '', '', '', '', '', '', '', ''),
('21-155', 'A-5-1-1.9', '電源供應器 12V 0.35A', 'RS-15-12', '', '', '', '', '', '', '', '', '', '', ''),
('21-156', 'B-1-1-1.1', 'FLUX DELUXE PACK 01，共1件\nSAFETY GLASSESx1\n無 ADAPTER、POWER CABLE、USB CABLE、TOOLHEAD CABLE、CABLE HOLDER，共5件', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-157', 'B-1-1-1.2', 'FLUX DELUXE PACK 02，共7件\nHOLDER MOUDLE x1\nLASER MOUDLE x1\nBLADE MOUDLE x1\nSCANNER CALIBRATION TOOL x1\n3mm ALLEN KEY x1\n0.4mm NEEDLEx1\n45度BLADEx1\n無 PRINTING TOOLHEAD、LUBRICANT，共2件', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-158', 'D-3-2-1.1', 'TATUNG UTP 24 AWGx4P', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-159', 'E-2-1-1.1', 'ADS1115', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-16', 'A-1-2-10.3', 'SMA外螺內針轉IPEX轉接線', '10cm', '', '', '', '', '', '', '', '', '', '', ''),
('21-160', 'E-2-1-2.1', 'TTL轉485模組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-161', 'E-2-1-3.1', '電流轉電壓模組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-162', 'E-2-1-4.1', 'USB轉TTL模組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-163', 'E-2-2-1.1', '降壓模組(紅)', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-164', 'E-2-2-2.1', '降壓模組MP1584EN', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-165', 'E-2-2-3.1', '降壓模組LM2596', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-166', 'E-2-2-4.1', '升壓模組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-167', 'E-2-3-1.1', 'M5 cameraF', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-168', 'E-2-3-2.1', 'ESP-32 CAM', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-169', 'E-2-3-3.1', 'Rpi攝影模組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-17', 'A-1-2-10.4', 'SMA外螺內針轉IPEX轉接線', '20cm', '', '', '', '', '', '', '', '', '', '', ''),
('21-170', 'E-2-3-4.1', '超音波感測器SEN0311', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-171', 'E-2-4-1.1', '巨龍紅外線LED', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-172', 'E-2-4-2.1', '神經運算棒', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-173', 'E-2-4-3.1', '非接觸式液位感測器', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-174', 'E-2-4-4.1', 'USB轉TTL傳輸線', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-175', 'E-2-5-1.1', '馬達控制器', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-176', 'E-2-5-2.1', 'RPI外殼', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-177', 'E-2-5-3.1', '微型電磁閥', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-178', 'E-2-5-4.1', '彈簧', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-179', 'E-2-6-1.1', '雨衣', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-18', 'A-1-2-11.1', '2.4G天線(內孔)', '195mm', '', '', '', '', '', '', '', '', '', '', ''),
('21-180', 'E-2-6-2.1', '雨衣', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-181', 'E-2-6-3.1', '雨衣', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-182', 'E-2-6-4.1', 'WIFI智能插座', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-183', 'E-3-1-1.1', '止付螺絲', 'M5x5', '', '', '', '', '', '', '', '', '', '', ''),
('21-184', 'E-3-1-1.1', '止付螺絲', 'M5x5', '', '', '', '', '', '', '', '', '', '', ''),
('21-185', 'E-3-1-1.2', 'U型夾', '1/4\" x 1 9/16', '', '', '', '', '', '', '', '', '', '', ''),
('21-186', 'E-3-1-1.2', 'U型夾', '1/4\" x 1 9/16', '', '', '', '', '', '', '', '', '', '', ''),
('21-187', 'E-3-1-1.3', 'U型夾', '1/4\" x 2 1/4\"', '', '', '', '', '', '', '', '', '', '', ''),
('21-188', 'E-3-1-1.3', 'U型夾', '1/4\" x 2 1/4\"', '', '', '', '', '', '', '', '', '', '', ''),
('21-189', 'E-3-1-1.3', '白鐵立布 ', '4分 100mm', '', '', '', '', '', '', '', '', '', '', ''),
('21-19', 'A-1-2-11.2', '2.4G天線(內針)', '55mm', '', '', '', '', '', '', '', '', '', '', ''),
('21-190', 'E-3-1-1.3', '白鐵立布', ' 4分 100mm', '', '', '', '', '', '', '', '', '', '', ''),
('21-191', 'E-4-3-1.1', '感光滾筒', '副廠Brother DR-420 適用MFC-7460DN 可列印約12,000頁', '', '', '', '', '', '', '', '', '', '', ''),
('21-2', 'A-1-1-1.2', '風向感測器', 'YGC-FX', ' 感測器', '', '', '', '', '', '', '', '', '', ''),
('21-20', 'A-1-2-11.3', '2.4G天線(內針)', '55mm 彎頭', '', '', '', '', '', '', '', '', '', '', ''),
('21-21', 'A-1-2-11.4', '2.4G天線(內針)', '195mm', '', '', '', '', '', '', '', '', '', '', ''),
('21-22', 'A-1-2-12.1', '3G天線(內針)', '170mm', '', '', '', '', '', '', '', '', '', '', ''),
('21-23', 'A-1-2-13.1', 'LinkIt Smart 7688', 'v1.0', '', '', '', '', '', '', '', '', '', '', ''),
('21-24', 'A-1-2-13.2', 'USB to MICRO B 80cm', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-25', 'A-1-2-14.1', '紅外型二氧化碳感測器模組', 'MH-Z14A ', '', '', '', '', '', '', '', '', '', '', ''),
('21-26', 'A-1-2-14.2', '紅外型二氧化碳感測器模組', 'K30', '', '', '', '', '', '', '', '', '', '', ''),
('21-27', 'A-1-2-15.1', '馬達MDN3BT3CRAS 09SEP08KA', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-28', 'A-1-2-16.1', '無刷抽水機 垂直式24V. 4分牙', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-29', 'A-1-2-17.1', 'AC-DC轉換器', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-3', 'A-1-1-1.3', '百葉箱 5層', 'JXBS-3001', '', '', '', '', '', '', '', '', '', '', ''),
('21-30', 'A-1-2-18.1', 'T型矽膠線組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-31', 'A-1-2-18.2', 'USB MICRO B 公帶線', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-32', 'A-1-2-18.3', 'USB 母帶線', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-33', 'A-1-2-18.4', 'Type C 免焊接頭', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-34', 'A-1-2-19.1', '降壓模組 12V轉5V', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-35', 'A-1-2-19.2', '降壓模組 12V-48V轉5V-12V', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-36', 'A-1-2-19.3', '降壓模組 48V-60V 15A', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-37', 'A-1-2-2.1', '空氣溫溼度感測器', 'TS-FTM01', '', '', '', '', '', '', '', '', '', '', ''),
('21-38', 'A-1-2-20.1', '光電開關 RMF-DU10N', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-39', 'A-1-2-21.1', '方形光電開關 JCGF50E-T10NAH', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-4', 'A-1-1-1.4', '百葉箱 9層', 'JXBS-3001-BYX', '', '', '', '', '', '', '', '', '', '', ''),
('21-40', 'A-1-2-22.1', '電源供應器12~22V 1820mA', 'LP1040-22-C1820', '', '', '', '', '', '', '', '', '', '', ''),
('21-41', 'A-1-2-23.1', 'HDMI19母 轉 DVI(24+1)公 轉接頭', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-42', 'A-1-2-23.2', 'HDMI19母 轉 DVI(24+5)公 轉接頭', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-43', 'A-1-2-23.3', 'USB 3.0 A母 轉 A母 轉接頭', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-44', 'A-1-2-23.4', 'HDMI母 轉 micro HDMI公 鍍金轉接頭', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-45', 'A-1-2-23.5', 'USB母 轉 Micro USB公 轉接頭', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-46', 'A-1-2-23.6', 'HDMI 轉 Mini HDMI 轉接頭', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-47', 'A-1-2-23.7', 'HDMI母 轉DP公  轉接頭', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-48', 'A-1-2-23.8', 'USB母 轉 Micro USB公 傳輸線 10CM', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-49', 'A-1-2-25.1', '天線 ASUS 9dBi High Gain Wireless Antenna', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-5', 'A-1-1-1.5', '溫溼度感測器+百葉箱 7層', '', ' 感測器', '', '', '', '', '', '', '', '', '', ''),
('21-50', 'A-1-2-25.2', '加厚抽屜隔板 6片裝', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-51', 'A-1-2-25.3', '晾衣夾組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-52', 'A-1-2-3.1', '人體紅外線感應模組', 'HC-SR501 TOP-208', '', '', '', '', '', '', '', '', '', '', ''),
('21-53', 'A-1-2-3.2', '照度感測器', 'BCE', '', '', '', '', '', '', '', '', '', '', ''),
('21-54', 'A-1-2-3.3', '人體紅外線感應透鏡', 'Ø16', '', '', '', '', '', '', '', '', '', '', ''),
('21-55', 'A-1-2-3.4', '人體紅外線感應透鏡', '23.3x14.8', '', '', '', '', '', '', '', '', '', '', ''),
('21-56', 'A-1-2-4.1', '超音波測距模組', 'HC-SR04', '', '', '', '', '', '', '', '', '', '', ''),
('21-57', 'A-1-2-4.2', 'MPU-6050模組', 'GY-521', '', '', '', '', '', '', '', '', '', '', ''),
('21-58', 'A-1-2-5.1', '2路繼電器模組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-59', 'A-1-2-5.2', '4路繼電器模組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-6', 'A-1-1-1.6', '大氣壓力感測器 4.5', 'MK-S-BR', ' 感測器', '', '', '', '', '', '', '', '', '', ''),
('21-60', 'A-1-2-6.1', 'GPS模組', 'CRIUS NEO-6 V3.0', '', '', '', '', '', '', '', '', '', '', ''),
('21-61', 'A-1-2-6.2', 'GPS模組', 'GM-8031T', '', '', '', '', '', '', '', '', '', '', ''),
('21-62', 'A-1-2-6.3', 'TF卡讀寫模組', 'TF', '', '', '', '', '', '', '', '', '', '', ''),
('21-63', 'A-1-2-6.4', 'SD卡模組', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-64', 'A-1-2-7.1', 'LinkIt Smart 7688  擴展板', 'v1.0', '', '', '', '', '', '', '', '', '', '', ''),
('21-65', 'A-1-2-7.2', 'LinkIt Smart 7688 Duo 擴展板', 'v1.0', '', '', '', '', '', '', '', '', '', '', ''),
('21-66', 'A-1-2-7.3', 'ESP32-WROVER 開發板', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-67', 'A-1-2-8.1', '電機驅動擴展板', 'L293D', '', '', '', '', '', '', '', '', '', '', ''),
('21-68', 'A-1-2-8.2', 'Arduino UNO', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-69', 'A-1-2-8.3', 'Seeeduino', 'R3', '', '', '', '', '', '', '', '', '', '', ''),
('21-7', 'A-1-2-1.1', '空氣溫溼度模組', 'SHT11', ' 感測器', '', '', '', '', '', '', '', '', '', ''),
('21-70', 'A-1-2-8.4', 'BeagleBone Black Rev.C 開發板', ' v2.21', '', '', '', '', '', '', '', '', '', '', ''),
('21-71', 'A-1-2-8.5', 'RAMPS1.4 控制介面板', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-72', 'A-1-2-9.1', 'PCB天線', '19X22', '', '', '', '', '', '', '', '', '', '', ''),
('21-73', 'A-1-2-9.2', 'PCB天線', '36X8', '', '', '', '', '', '', '', '', '', '', ''),
('21-74', 'A-1-2-9.3', 'PCB天線', '39X7.5', '', '', '', '', '', '', '', '', '', '', ''),
('21-75', 'A-1-2-9.4', 'PCB天線', '45X15', '', '', '', '', '', '', '', '', '', '', ''),
('21-76', 'A-1-2-9.5', 'PCB天線', '58X26', '', '', '', '', '', '', '', '', '', '', ''),
('21-77', 'A-1-3-1.1', '4.5 MK-A', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-78', 'A-1-3-1.2', '4.5 MK-S無485(照度)', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-79', 'A-1-3-1.3', '4.5 MK-S有485', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-8', 'A-1-2-1.2', '氣壓感測器模組', 'GY-BMP280        ', ' 感測器', '', '', '', '', '', '', '', '', '', ''),
('21-80', 'A-1-3-2.1', '4.5 S PCB板', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-81', 'A-1-3-3.1', '4.5 MK-S無485', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-82', 'A-1-3-3.2', '4.5 G PCB板', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-83', 'A-1-3-3.3', '無線自動傳輸模組 MK-G 4.5', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-84', 'A-1-3-3.4', '數據節點 MK-A 4.5', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-85', 'A-1-3-4.1', '風速感測器 MK-S-WS 4.5', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-86', 'A-1-3-4.1', '大氣壓力感測器 MK-S-BR 4.5', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-87', 'A-1-3-4.2', '風向感測器 MK-S-WD 4.5', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-88', 'A-1-3-4.2', '空氣溫溼度感測器 MK-S-HT 4.5', '', '', '', '', '', '', '', '', '', '', '', ''),
('21-89', 'A-1-3-6.1', '變壓器(裸)', 'E6625-25W 2A 9V', '', '', '', '', '', '', '', '', '', '', ''),
('21-9', 'A-1-2-1.3', '氣壓感測器模組', 'GY-68 BMP180', ' 感測器', '', '', '', '', '', '', '', '', '', ''),
('21-90', 'A-1-3-6.2', '變壓器(裸)', 'EI-66 2A 12V', '', '', '', '', '', '', '', '', '', '', ''),
('21-91', 'A-1-3-6.3', '變壓器(裸)', 'EI-66 2A 24V', '', '', '', '', '', '', '', '', '', '', ''),
('21-92', 'A-1-3-6.4', 'RS232轉CANBUS轉換器', 'UT-2501', '', '', '', '', '', '', '', '', '', '', ''),
('21-93', 'A-1-4-1.1', 'Molex Header 1.25mm 2Pin', 'Molex 53047-0210', '', '', '', '', '', '', '', '', '', '', ''),
('21-94', 'A-1-4-1.2', 'Molex Header 1.25mm 3Pin', 'Molex 53047-0310', '', '', '', '', '', '', '', '', '', '', ''),
('21-95', 'A-1-4-1.3', 'Molex Header 1.25mm 4Pin', 'Molex 53047-0410', '', '', '', '', '', '', '', '', '', '', ''),
('21-96', 'A-1-4-1.4', 'Molex Header 1.25mm 5Pin', 'Molex 53047-0510', '', '', '', '', '', '', '', '', '', '', ''),
('21-97', 'A-1-4-1.5', 'Molex Header 1.25mm 6Pin', 'Molex 53047-0610', '', '', '', '', '', '', '', '', '', '', ''),
('21-98', 'A-1-4-1.6', 'B4B-XH-A 2.54mm 3Pin', 'CX-W250-03', '', '', '', '', '', '', '', '', '', '', ''),
('21-99', 'A-1-4-1.7', 'B4B-XH-A 2.54mm  4Pin', 'CX-W250-04', '', '', '', '', '', '', '', '', '', '', ''),
('22', 'E319-2', 'M6x5 用黑色螺絲起子', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('23', 'E3S12', 'M8x12 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('24', 'E3S25-1', 'M2 1m 彈簧墊圈', '', ' 彈簧墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('25', 'E3S25-2', 'M2 (225)', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('26', 'E3S26-1', 'M6-1m  彈簧墊圈', '', ' 彈簧墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('27', 'E3S26-2', 'M6 1/4\"', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('28', 'E3S27-1', 'M12 1/2\"  墊圈', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('29', 'E3S27-2', 'M12 1/2\"  彈簧墊圈', '', ' 彈簧墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('3', 'E3S16', 'M10x30 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('30', 'E3S28-1', 'M3  墊圈', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('31', 'E3S28-2', 'M3 1/8\" 墊圈', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('32', 'E3S28-3', 'M3 1m 墊圈', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('33', 'E3S30', '7/8 墊圈', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('34', 'E3S31-1', 'M4 1m 彈簧墊圈', '', ' 彈簧墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('35', 'E3S31-2', 'M4 1m 彈簧墊圈', '', ' 彈簧墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('36', 'E3S31-3', 'M4 5/32\"  墊圈', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('37', 'E3S32-1', 'M8  5/16\"  墊圈', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('38', 'E3S32-2', 'M8  5/16\"  彈簧墊圈', '', ' 彈簧墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('39', 'E3S34-1', 'M5  3/16\" 墊圈', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('4', 'E3S01', 'M2X16 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('40', 'E3S34-2', 'M5 1m\" 彈簧墊圈', '', ' 彈簧墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('41', 'E3S35-1', 'M10 3/8\"  彈簧墊圈', '', ' 彈簧墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('42', 'E3S35-2', 'M10 1M 彈簧墊圈', '', ' 彈簧墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('43', 'E3S35-3', '3/8\"  墊圈', '', ' 墊圈', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('44', 'E3S39', 'M3 螺帽', '', ' 螺帽', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('4441', 't', 't', 't', 't', 't', 't', 't', 't', 't', 't', 't', '', '', 't'),
('45', 'E3S40', 'M8 螺帽', '', ' 螺帽', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('46', 'E3S42', 'M4 螺帽', '', ' 螺帽', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('47', 'E3S43', 'M10 螺帽', '', ' 螺帽', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('48', 'E3S44', 'M5 螺帽', '', ' 螺帽', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('49', 'E3S45', 'M6  螺帽', '', ' 螺帽', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('5', 'E3S4-3', 'M3x12 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('50', 'E3P01', '培霖', '', ' 培霖', '', '', '', '', '', '', '個', '', '', ''),
('6', 'E3S4-2', 'M3x15 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('7', 'E3S4-1', 'M3x35  螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('8', 'E3S10', 'M4X10 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('9', 'E3S02', 'M4x16 螺絲', '六角', ' 螺絲', '', '', '', '', '', '', '個', '', '', '鴻霖'),
('test', 'A000001', '清洗統槽', 'test', 'test', 'test', 'test', 'test', 'test', 'test', 'test', 'test', 'test', 'test', 'test');

--
-- 已匯出資料表的索引
--

--
-- 資料表索引 `product_info`
--
ALTER TABLE `product_info`
  ADD PRIMARY KEY (`NO`);

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
